3 In the diagram the mountain and valley folds are indicated.

To get a nice running set of gearwheels varying in size you need to experiment with the number of segments. The large wheel in this set has 6 segments, that are divided in 16 x 16. So the total amount of teeth is 6*(16/2-1) = 42. The real set I made has a motor driving the small wheel, so the total set is moving continuously.