X Y PQR S

AB CD

9 Unfold front flap. See 10, 11 and also

finished model for position of points P, Q, R and S

X S P QA

B CD

10

A

BC D

11

S

12 Only upper flap; don’t push flat Point S swivels automatically

S 13 Fold the flaps back to

diagram 10 and repeat 11-13 on the right side

14 Outside reverse fold

15 Outside reverse fold 16 17