Could not determine printer settings.  If printer is connected
to a parallel port (LPTx) no configuration is necessary.  If
printer is connected to a serial port (COMx) find the DOS MODE
command for this port and use those settings.  This is usually
found in your autoexec.bat file.

Max Printer VM (KB):
Max Suggested VM (KB):